Data Type:                         MW11
Project ID:                        TAO2003
Launch Site Type/Site ID:          Ron Brown
Launch Location (lon,lat,alt):     94 58.80'W, 6 31.80'N, -94.98000 6.53000 10
GMT Launch Time (y,m,d,h,m,s):     2003, 11, 17, 17:02:00
Sonde Id:                          
/
/
/
System Operator/Comments:          ,
/
/
 Time  Press  Temp  Dewpt  RH    Uwind  Vwind  Wspd  Dir   dZ      Lon     Lat    Rng   Az     Alt    Qp   Qt   Qh   Qu   Qv   Quv
  sec    mb     C     C     %     m/s    m/s   m/s   deg   m/s     deg     deg     km   deg     m     mb   C    %    m/s  m/s  m/s
------ ------ ----- ----- ----- ------ ------ ----- ----- ----- -------- ------- ----- ----- ------- ---- ---- ---- ---- ---- ----
  -1.0 1010.7  24.5  24.5 100.0    7.0    6.1   9.3 229.0  99.0  -94.980   6.530 999.0 999.0    10.0 99.0 99.0 99.0 99.0 99.0 99.0
   2.0 1010.0  24.8  23.5  92.3    6.3    5.6   8.5 228.5   3.2  -94.980   6.530 999.0 999.0    16.5 99.0 99.0 99.0 99.0 99.0 99.0
   4.0 1009.2  24.8  23.4  91.8    6.4    5.7   8.6 228.0   3.2  -94.980   6.530 999.0 999.0    22.9 99.0 99.0 99.0 99.0 99.0 99.0
   6.0 1008.5  24.8  23.4  91.3    6.4    5.9   8.7 227.6   3.2  -94.980   6.530 999.0 999.0    29.3 99.0 99.0 99.0 99.0 99.0 99.0
   8.0 1007.8  24.8  23.3  90.9    6.5    6.0   8.8 227.2   3.2  -94.979   6.530 999.0 999.0    35.7 99.0 99.0 99.0 99.0 99.0 99.0
  10.0 1007.0  24.8  23.2  90.6    6.6    6.2   9.0 226.9   3.2  -94.979   6.531 999.0 999.0    42.2 99.0 99.0 99.0 99.0 99.0 99.0
  12.0 1006.3  24.8  23.2  90.4    6.7    6.3   9.2 226.5   3.3  -94.979   6.531 999.0 999.0    48.8 99.0 99.0 99.0 99.0 99.0 99.0
  14.0 1005.5  24.8  23.1  90.2    6.8    6.5   9.3 226.3   3.3  -94.979   6.531 999.0 999.0    55.4 99.0 99.0 99.0 99.0 99.0 99.0
  16.0 1004.8  24.8  23.1  90.1    6.9    6.6   9.5 226.1   3.3  -94.979   6.531 999.0 999.0    62.1 99.0 99.0 99.0 99.0 99.0 99.0
  18.0 1004.0  24.8  23.1  90.1    7.0    6.7   9.7 225.9   3.3  -94.979   6.531 999.0 999.0    68.8 99.0 99.0 99.0 99.0 99.0 99.0
  20.0 1003.2  24.7  23.0  90.1    7.1    6.9   9.9 225.9   3.3  -94.979   6.531 999.0 999.0    75.5 99.0 99.0 99.0 99.0 99.0 99.0
  22.0 1002.4  24.7  23.0  90.1    7.2    7.0  10.0 225.9   3.4  -94.979   6.531 999.0 999.0    82.3 99.0 99.0 99.0 99.0 99.0 99.0
  24.0 1001.7  24.6  22.9  90.2    7.3    7.1  10.2 225.9   3.4  -94.978   6.531 999.0 999.0    89.2 99.0 99.0 99.0 99.0 99.0 99.0
  26.0 1000.9  24.6  22.9  90.3    7.4    7.1  10.3 226.0   3.4  -94.978   6.532 999.0 999.0    96.0 99.0 99.0 99.0 99.0 99.0 99.0
  28.0 1000.1  24.5  22.9  90.4    7.5    7.2  10.4 226.1   3.4  -94.978   6.532 999.0 999.0   102.9 99.0 99.0 99.0 99.0 99.0 99.0
  30.0  999.3  24.4  22.8  90.5    7.6    7.3  10.5 226.2   3.4  -94.978   6.532 999.0 999.0   109.7 99.0 99.0 99.0 99.0 99.0 99.0
  32.0  998.6  24.4  22.8  90.7    7.6    7.3  10.6 226.3   3.4  -94.978   6.532 999.0 999.0   116.5 99.0 99.0 99.0 99.0 99.0 99.0
  34.0  997.8  24.3  22.8  90.8    7.7    7.3  10.6 226.4   3.4  -94.978   6.532 999.0 999.0   123.3 99.0 99.0 99.0 99.0 99.0 99.0
  36.0  997.0  24.3  22.7  91.0    7.8    7.4  10.7 226.5   3.4  -94.978   6.532 999.0 999.0   130.1 99.0 99.0 99.0 99.0 99.0 99.0
  38.0  996.3  24.2  22.7  91.1    7.8    7.4  10.8 226.6   3.4  -94.978   6.532 999.0 999.0   136.8 99.0 99.0 99.0 99.0 99.0 99.0
  40.0  995.5  24.1  22.7  91.3    7.9    7.4  10.8 226.7   3.4  -94.977   6.532 999.0 999.0   143.5 99.0 99.0 99.0 99.0 99.0 99.0
  42.0  994.7  24.1  22.6  91.4    7.9    7.5  10.9 226.7   3.4  -94.977   6.533 999.0 999.0   150.2 99.0 99.0 99.0 99.0 99.0 99.0
  44.0  994.0  24.0  22.6  91.5    8.0    7.5  10.9 226.8   3.4  -94.977   6.533 999.0 999.0   156.9 99.0 99.0 99.0 99.0 99.0 99.0
  46.0  993.2  24.0  22.6  91.7    8.0    7.5  11.0 226.9   3.4  -94.977   6.533 999.0 999.0   163.5 99.0 99.0 99.0 99.0 99.0 99.0
  48.0  992.5  23.9  22.5  91.8    8.1    7.5  11.0 227.0   3.5  -94.977   6.533 999.0 999.0   170.3 99.0 99.0 99.0 99.0 99.0 99.0
  50.0  991.7  23.9  22.5  91.9    8.1    7.5  11.1 227.1   3.5  -94.977   6.533 999.0 999.0   177.0 99.0 99.0 99.0 99.0 99.0 99.0
  52.0  990.9  23.8  22.5  92.0    8.2    7.5  11.1 227.3   3.5  -94.977   6.533 999.0 999.0   183.9 99.0 99.0 99.0 99.0 99.0 99.0
  54.0  990.2  23.8  22.5  92.1    8.2    7.5  11.2 227.6   3.5  -94.976   6.533 999.0 999.0   190.9 99.0 99.0 99.0 99.0 99.0 99.0
  56.0  989.4  23.7  22.4  92.3    8.3    7.5  11.2 227.9   3.6  -94.976   6.534 999.0 999.0   198.0 99.0 99.0 99.0 99.0 99.0 99.0
  58.0  988.5  23.7  22.4  92.4    8.4    7.4  11.2 228.3   3.6  -94.976   6.534 999.0 999.0   205.2 99.0 99.0 99.0 99.0 99.0 99.0
  60.0  987.7  23.7  22.4  92.5    8.4    7.4  11.2 228.7   3.6  -94.976   6.534 999.0 999.0   212.5 99.0 99.0 99.0 99.0 99.0 99.0
  62.0  986.9  23.6  22.4  92.6    8.5    7.3  11.2 229.1   3.7  -94.976   6.534 999.0 999.0   220.0 99.0 99.0 99.0 99.0 99.0 99.0
  64.0  986.0  23.6  22.4  92.8    8.5    7.2  11.2 229.6   3.7  -94.976   6.534 999.0 999.0   227.4 99.0 99.0 99.0 99.0 99.0 99.0
  66.0  985.2  23.5  22.3  92.9    8.5    7.2  11.1 230.0   3.7  -94.975   6.534 999.0 999.0   234.9 99.0 99.0 99.0 99.0 99.0 99.0
  68.0  984.4  23.5  22.3  93.0    8.5    7.1  11.1 230.3   3.7  -94.975   6.534 999.0 999.0   242.3 99.0 99.0 99.0 99.0 99.0 99.0
  70.0  983.5  23.4  22.3  93.1    8.6    7.0  11.1 230.6   3.7  -94.975   6.534 999.0 999.0   249.8 99.0 99.0 99.0 99.0 99.0 99.0
  72.0  982.7  23.4  22.2  93.1    8.6    7.0  11.0 230.9   3.8  -94.975   6.535 999.0 999.0   257.3 99.0 99.0 99.0 99.0 99.0 99.0
  74.0  981.8  23.4  22.2  93.2    8.6    6.9  11.0 231.0   3.8  -94.975   6.535 999.0 999.0   264.8 99.0 99.0 99.0 99.0 99.0 99.0
  76.0  981.0  23.3  22.2  93.3    8.5    6.9  11.0 231.0   3.8  -94.975   6.535 999.0 999.0   272.4 99.0 99.0 99.0 99.0 99.0 99.0
  78.0  980.2  23.3  22.2  93.3    8.5    6.9  10.9 230.9   3.8  -94.975   6.535 999.0 999.0   280.0 99.0 99.0 99.0 99.0 99.0 99.0
  80.0  979.3  23.3  22.1  93.3    8.5    6.9  10.9 230.7   3.8  -94.974   6.535 999.0 999.0   287.6 99.0 99.0 99.0 99.0 99.0 99.0
  82.0  978.5  23.2  22.1  93.3    8.4    6.9  10.9 230.4   3.8  -94.974   6.535 999.0 999.0   295.2 99.0 99.0 99.0 99.0 99.0 99.0
  84.0  977.6  23.2  22.1  93.3    8.3    7.0  10.9 230.1   3.8  -94.974   6.535 999.0 999.0   302.8 99.0 99.0 99.0 99.0 99.0 99.0
  86.0  976.8  23.1  22.0  93.3    8.3    7.0  10.9 229.7   3.8  -94.974   6.535 999.0 999.0   310.3 99.0 99.0 99.0 99.0 99.0 99.0
  88.0  975.9  23.1  22.0  93.3    8.2    7.1  10.8 229.2   3.8  -94.974   6.536 999.0 999.0   317.9 99.0 99.0 99.0 99.0 99.0 99.0
  90.0  975.1  23.1  21.9  93.2    8.1    7.1  10.8 228.7   3.8  -94.974   6.536 999.0 999.0   325.4 99.0 99.0 99.0 99.0 99.0 99.0
  92.0  974.3  23.0  21.9  93.2    8.1    7.2  10.8 228.3   3.7  -94.973   6.536 999.0 999.0   332.8 99.0 99.0 99.0 99.0 99.0 99.0
  94.0  973.4  23.0  21.9  93.1    8.0    7.3  10.8 227.8   3.7  -94.973   6.536 999.0 999.0   340.3 99.0 99.0 99.0 99.0 99.0 99.0
  96.0  972.6  23.0  21.8  93.1    7.9    7.3  10.8 227.4   3.7  -94.973   6.536 999.0 999.0   347.8 99.0 99.0 99.0 99.0 99.0 99.0
  98.0  971.8  23.0  21.8  93.0    7.9    7.4  10.8 227.0   3.7  -94.973   6.536 999.0 999.0   355.2 99.0 99.0 99.0 99.0 99.0 99.0
 100.0  970.9  22.9  21.8  92.9    7.9    7.4  10.8 226.6   3.6  -94.973   6.536 999.0 999.0   362.7 99.0 99.0 99.0 99.0 99.0 99.0
 102.0  970.1  22.9  21.7  92.9    7.8    7.5  10.8 226.3   3.6  -94.973   6.537 999.0 999.0   370.0 99.0 99.0 99.0 99.0 99.0 99.0
 104.0  969.3  22.9  21.7  92.8    7.8    7.5  10.8 226.1   3.6  -94.973   6.537 999.0 999.0   377.3 99.0 99.0 99.0 99.0 99.0 99.0
 106.0  968.5  22.8  21.6  92.8    7.8    7.5  10.8 226.0   3.5  -94.972   6.537 999.0 999.0   384.5 99.0 99.0 99.0 99.0 99.0 99.0
 108.0  967.7  22.8  21.6  92.8    7.7    7.5  10.8 225.9   3.5  -94.972   6.537 999.0 999.0   391.6 99.0 99.0 99.0 99.0 99.0 99.0
 110.0  967.0  22.8  21.6  92.8    7.7    7.5  10.8 225.9   3.4  -94.972   6.537 999.0 999.0   398.5 99.0 99.0 99.0 99.0 99.0 99.0
 112.0  966.2  22.8  21.5  92.8    7.7    7.4  10.7 226.1   3.4  -94.972   6.537 999.0 999.0   405.3 99.0 99.0 99.0 99.0 99.0 99.0
 114.0  965.5  22.7  21.5  92.8    7.7    7.4  10.7 226.3   3.4  -94.972   6.537 999.0 999.0   412.0 99.0 99.0 99.0 99.0 99.0 99.0
 116.0  964.8  22.7  21.5  92.9    7.7    7.3  10.6 226.6   3.4  -94.972   6.537 999.0 999.0   418.5 99.0 99.0 99.0 99.0 99.0 99.0
 118.0  964.0  22.6  21.5  92.9    7.7    7.2  10.6 227.1   3.3  -94.972   6.538 999.0 999.0   425.1 99.0 99.0 99.0 99.0 99.0 99.0
 120.0  963.3  22.6  21.4  93.0    7.8    7.1  10.5 227.6   3.3  -94.971   6.538 999.0 999.0   431.5 99.0 99.0 99.0 99.0 99.0 99.0
 122.0  962.6  22.6  21.4  93.1    7.8    6.9  10.4 228.3   3.3  -94.971   6.538 999.0 999.0   438.0 99.0 99.0 99.0 99.0 99.0 99.0
 124.0  961.9  22.5  21.4  93.2    7.8    6.8  10.3 229.1   3.3  -94.971   6.538 999.0 999.0   444.4 99.0 99.0 99.0 99.0 99.0 99.0
 126.0  961.2  22.5  21.4  93.3    7.8    6.6  10.2 230.0   3.3  -94.971   6.538 999.0 999.0   450.9 99.0 99.0 99.0 99.0 99.0 99.0
 128.0  960.5  22.5  21.4  93.5    7.8    6.3  10.1 231.0   3.4  -94.971   6.538 999.0 999.0   457.4 99.0 99.0 99.0 99.0 99.0 99.0
 130.0  959.8  22.4  21.4  93.7    7.8    6.1   9.9 232.0   3.4  -94.971   6.538 999.0 999.0   464.0 99.0 99.0 99.0 99.0 99.0 99.0
 132.0  959.0  22.4  21.3  93.8    7.8    5.9   9.8 233.1   3.4  -94.971   6.538 999.0 999.0   470.7 99.0 99.0 99.0 99.0 99.0 99.0
 134.0  958.3  22.3  21.3  94.1    7.8    5.6   9.6 234.3   3.5  -94.971   6.539 999.0 999.0   477.6 99.0 99.0 99.0 99.0 99.0 99.0
 136.0  957.5  22.3  21.3  94.3    7.8    5.4   9.5 235.5   3.5  -94.970   6.539 999.0 999.0   484.5 99.0 99.0 99.0 99.0 99.0 99.0
 138.0  956.7  22.2  21.3  94.5    7.8    5.1   9.3 236.7   3.5  -94.970   6.539 999.0 999.0   491.6 99.0 99.0 99.0 99.0 99.0 99.0
 140.0  955.9  22.2  21.3  94.8    7.8    4.9   9.2 237.8   3.6  -94.970   6.539 999.0 999.0   498.8 99.0 99.0 99.0 99.0 99.0 99.0
 142.0  955.1  22.1  21.3  95.1    7.8    4.7   9.1 238.9   3.6  -94.970   6.539 999.0 999.0   506.1 99.0 99.0 99.0 99.0 99.0 99.0
 144.0  954.3  22.1  21.3  95.4    7.7    4.5   8.9 240.0   3.6  -94.970   6.539 999.0 999.0   513.5 99.0 99.0 99.0 99.0 99.0 99.0
 146.0  953.5  22.0  21.3  95.6    7.7    4.3   8.8 240.9   3.6  -94.970   6.539 999.0 999.0   521.0 99.0 99.0 99.0 99.0 99.0 99.0
 148.0  952.7  22.0  21.3  95.9    7.7    4.1   8.8 241.8   3.6  -94.970   6.539 999.0 999.0   528.5 99.0 99.0 99.0 99.0 99.0 99.0
 150.0  951.9  21.9  21.3  96.2    7.7    4.0   8.7 242.6   3.6  -94.969   6.539 999.0 999.0   536.0 99.0 99.0 99.0 99.0 99.0 99.0
 152.0  951.1  21.9  21.3  96.4    7.7    3.9   8.7 243.2   3.6  -94.969   6.539 999.0 999.0   543.4 99.0 99.0 99.0 99.0 99.0 99.0
 154.0  950.3  21.9  21.3  96.7    7.8    3.8   8.7 243.7   3.6  -94.969   6.539 999.0 999.0   550.8 99.0 99.0 99.0 99.0 99.0 99.0
 156.0  949.5  21.9  21.3  96.9    7.8    3.8   8.7 244.1   3.6  -94.969   6.539 999.0 999.0   558.1 99.0 99.0 99.0 99.0 99.0 99.0
 158.0  948.7  21.8  21.4  97.0    7.9    3.8   8.7 244.4   3.5  -94.969   6.540 999.0 999.0   565.3 99.0 99.0 99.0 99.0 99.0 99.0
 160.0  947.9  21.8  21.4  97.1    7.9    3.8   8.8 244.5   3.5  -94.969   6.540 999.0 999.0   572.4 99.0 99.0 99.0 99.0 99.0 99.0
 162.0  947.2  21.8  21.4  97.1    8.0    3.8   8.8 244.6   3.5  -94.969   6.540 999.0 999.0   579.3 99.0 99.0 99.0 99.0 99.0 99.0
 164.0  946.4  21.8  21.4  97.1    8.0    3.8   8.9 244.6   3.4  -94.968   6.540 999.0 999.0   586.1 99.0 99.0 99.0 99.0 99.0 99.0
 166.0  945.7  21.8  21.4  97.1    8.0    3.8   8.9 244.5   3.4  -94.968   6.540 999.0 999.0   592.8 99.0 99.0 99.0 99.0 99.0 99.0
 168.0  945.0  21.8  21.3  97.0    8.0    3.9   8.9 244.3   3.4  -94.968   6.540 999.0 999.0   599.4 99.0 99.0 99.0 99.0 99.0 99.0
 170.0  944.3  21.8  21.3  96.9    8.0    3.9   8.9 244.0   3.4  -94.968   6.540 999.0 999.0   606.0 99.0 99.0 99.0 99.0 99.0 99.0
 172.0  943.6  21.8  21.3  96.8    8.0    4.0   8.9 243.6   3.3  -94.968   6.540 999.0 999.0   612.5 99.0 99.0 99.0 99.0 99.0 99.0
 174.0  942.9  21.8  21.2  96.7    7.9    4.0   8.9 243.1   3.3  -94.968   6.540 999.0 999.0   619.1 99.0 99.0 99.0 99.0 99.0 99.0
 176.0  942.2  21.8  21.2  96.6    7.8    4.1   8.8 242.6   3.3  -94.968   6.540 999.0 999.0   625.6 99.0 99.0 99.0 99.0 99.0 99.0
 178.0  941.4  21.7  21.2  96.5    7.7    4.1   8.8 241.9   3.3  -94.967   6.540 999.0 999.0   632.2 99.0 99.0 99.0 99.0 99.0 99.0
 180.0  940.7  21.7  21.1  96.5    7.6    4.2   8.7 241.0   3.3  -94.967   6.540 999.0 999.0   638.9 99.0 99.0 99.0 99.0 99.0 99.0
 182.0  940.0  21.7  21.1  96.5    7.5    4.3   8.6 240.1   3.3  -94.967   6.540 999.0 999.0   645.6 99.0 99.0 99.0 99.0 99.0 99.0
 184.0  939.3  21.6  21.1  96.5    7.3    4.4   8.5 239.1   3.4  -94.967   6.540 999.0 999.0   652.3 99.0 99.0 99.0 99.0 99.0 99.0
 186.0  938.6  21.6  21.0  96.5    7.2    4.5   8.4 238.1   3.4  -94.967   6.541 999.0 999.0   659.1 99.0 99.0 99.0 99.0 99.0 99.0
 188.0  937.8  21.5  21.0  96.6    7.0    4.6   8.4 237.0   3.4  -94.967   6.541 999.0 999.0   665.9 99.0 99.0 99.0 99.0 99.0 99.0
 190.0  937.1  21.5  20.9  96.6    6.9    4.6   8.3 235.9   3.4  -94.967   6.541 999.0 999.0   672.7 99.0 99.0 99.0 99.0 99.0 99.0
 192.0  936.3  21.4  20.9  96.7    6.7    4.7   8.2 234.9   3.4  -94.966   6.541 999.0 999.0   679.6 99.0 99.0 99.0 99.0 99.0 99.0
 194.0  935.6  21.4  20.9  96.8    6.6    4.8   8.2 234.0   3.5  -94.966   6.541 999.0 999.0   686.5 99.0 99.0 99.0 99.0 99.0 99.0
 196.0  934.9  21.4  20.8  96.8    6.5    4.9   8.1 233.2   3.5  -94.966   6.541 999.0 999.0   693.5 99.0 99.0 99.0 99.0 99.0 99.0
 198.0  934.1  21.3  20.8  96.8    6.4    4.9   8.1 232.7   3.5  -94.966   6.541 999.0 999.0   700.4 99.0 99.0 99.0 99.0 99.0 99.0
 200.0  933.3  21.3  20.8  96.9    6.4    4.9   8.0 232.4   3.6  -94.966   6.541 999.0 999.0   707.5 99.0 99.0 99.0 99.0 99.0 99.0
 202.0  932.6  21.2  20.7  96.9    6.3    4.9   8.0 232.4   3.6  -94.966   6.541 999.0 999.0   714.6 99.0 99.0 99.0 99.0 99.0 99.0
 204.0  931.8  21.2  20.7  96.9    6.3    4.8   7.9 232.6   3.7  -94.966   6.541 999.0 999.0   721.7 99.0 99.0 99.0 99.0 99.0 99.0
 206.0  931.0  21.2  20.7  96.9    6.3    4.7   7.9 233.1   3.7  -94.966   6.541 999.0 999.0   729.0 99.0 99.0 99.0 99.0 99.0 99.0
 208.0  930.3  21.2  20.7  96.9    6.3    4.6   7.8 234.0   3.7  -94.966   6.541 999.0 999.0   736.3 99.0 99.0 99.0 99.0 99.0 99.0
 210.0  929.5  21.1  20.6  96.9    6.4    4.5   7.8 235.0   3.8  -94.965   6.542 999.0 999.0   743.8 99.0 99.0 99.0 99.0 99.0 99.0
 212.0  928.7  21.1  20.6  96.9    6.4    4.3   7.7 236.4   3.8  -94.965   6.542 999.0 999.0   751.4 99.0 99.0 99.0 99.0 99.0 99.0
 214.0  927.8  21.1  20.6  96.9    6.5    4.1   7.7 237.9   3.8  -94.965   6.542 999.0 999.0   759.0 99.0 99.0 99.0 99.0 99.0 99.0
 216.0  927.0  21.1  20.5  96.9    6.6    3.9   7.6 239.7   3.9  -94.965   6.542 999.0 999.0   766.8 99.0 99.0 99.0 99.0 99.0 99.0
 218.0  926.2  21.0  20.5  96.9    6.7    3.6   7.6 241.6   3.9  -94.965   6.542 999.0 999.0   774.7 99.0 99.0 99.0 99.0 99.0 99.0
 220.0  925.3  21.0  20.5  96.8    6.8    3.4   7.5 243.6   3.9  -94.965   6.542 999.0 999.0   782.7 99.0 99.0 99.0 99.0 99.0 99.0
 222.0  924.5  21.0  20.5  96.8    6.9    3.1   7.5 245.7   3.9  -94.965   6.542 999.0 999.0   790.7 99.0 99.0 99.0 99.0 99.0 99.0
 224.0  923.6  20.9  20.4  96.8    7.0    2.8   7.5 247.8   3.9  -94.965   6.542 999.0 999.0   798.6 99.0 99.0 99.0 99.0 99.0 99.0
 226.0  922.8  20.9  20.4  96.9    7.1    2.6   7.5 249.8   3.9  -94.964   6.542 999.0 999.0   806.6 99.0 99.0 99.0 99.0 99.0 99.0
 228.0  921.9  20.9  20.4  96.9    7.2    2.4   7.6 251.7   3.9  -94.964   6.542 999.0 999.0   814.5 99.0 99.0 99.0 99.0 99.0 99.0
 230.0  921.1  20.8  20.3  96.9    7.3    2.2   7.6 253.5   3.9  -94.964   6.542 999.0 999.0   822.3 99.0 99.0 99.0 99.0 99.0 99.0
 232.0  920.3  20.8  20.3  96.9    7.4    2.0   7.7 255.0   3.8  -94.964   6.542 999.0 999.0   830.1 99.0 99.0 99.0 99.0 99.0 99.0
 234.0  919.5  20.8  20.3  96.9    7.5    1.8   7.7 256.4   3.8  -94.964   6.542 999.0 999.0   837.7 99.0 99.0 99.0 99.0 99.0 99.0
 236.0  918.7  20.7  20.2  96.9    7.6    1.7   7.8 257.5   3.8  -94.964   6.542 999.0 999.0   845.2 99.0 99.0 99.0 99.0 99.0 99.0
 238.0  917.9  20.7  20.2  96.9    7.7    1.6   7.9 258.4   3.7  -94.964   6.542 999.0 999.0   852.7 99.0 99.0 99.0 99.0 99.0 99.0
 240.0  917.1  20.7  20.2  96.8    7.8    1.5   8.0 259.1   3.7  -94.964   6.542 999.0 999.0   860.0 99.0 99.0 99.0 99.0 99.0 99.0
 242.0  916.4  20.7  20.1  96.8    7.9    1.5   8.1 259.6   3.6  -94.963   6.542 999.0 999.0   867.3 99.0 99.0 99.0 99.0 99.0 99.0
 244.0  915.6  20.6  20.1  96.6    8.0    1.4   8.1 260.0   3.6  -94.963   6.542 999.0 999.0   874.5 99.0 99.0 99.0 99.0 99.0 99.0
 246.0  914.8  20.6  20.0  96.5    8.1    1.4   8.2 260.3   3.5  -94.963   6.542 999.0 999.0   881.6 99.0 99.0 99.0 99.0 99.0 99.0
 248.0  914.1  20.6  20.0  96.3    8.1    1.4   8.2 260.5   3.5  -94.963   6.542 999.0 999.0   888.6 99.0 99.0 99.0 99.0 99.0 99.0
 250.0  913.4  20.6  20.0  96.0    8.1    1.3   8.2 260.7   3.4  -94.963   6.542 999.0 999.0   895.6 99.0 99.0 99.0 99.0 99.0 99.0
 252.0  912.7  20.6  19.9  95.8    8.1    1.3   8.2 260.8   3.3  -94.963   6.542 999.0 999.0   902.4 99.0 99.0 99.0 99.0 99.0 99.0
 254.0  912.0  20.6  19.9  95.5    8.1    1.3   8.2 260.9   3.3  -94.962   6.543 999.0 999.0   909.1 99.0 99.0 99.0 99.0 99.0 99.0
 256.0  911.3  20.6  19.8  95.2    8.0    1.3   8.1 261.0   3.2  -94.962   6.543 999.0 999.0   915.7 99.0 99.0 99.0 99.0 99.0 99.0
 258.0  910.6  20.6  19.8  95.0    8.0    1.2   8.1 261.1   3.2  -94.962   6.543 999.0 999.0   922.2 99.0 99.0 99.0 99.0 99.0 99.0
 260.0  909.9  20.6  19.7  94.7    7.9    1.2   8.0 261.3   3.2  -94.962   6.543 999.0 999.0   928.6 99.0 99.0 99.0 99.0 99.0 99.0
 262.0  909.3  20.6  19.7  94.5    7.9    1.2   8.0 261.5   3.1  -94.962   6.543 999.0 999.0   934.8 99.0 99.0 99.0 99.0 99.0 99.0
 264.0  908.6  20.5  19.6  94.3    7.8    1.1   7.9 261.8   3.1  -94.962   6.543 999.0 999.0   940.9 99.0 99.0 99.0 99.0 99.0 99.0
 266.0  908.0  20.5  19.6  94.1    7.8    1.1   7.9 262.1   3.1  -94.962   6.543 999.0 999.0   947.0 99.0 99.0 99.0 99.0 99.0 99.0
 268.0  907.4  20.5  19.5  93.9    7.7    1.0   7.8 262.6   3.1  -94.961   6.543 999.0 999.0   952.9 99.0 99.0 99.0 99.0 99.0 99.0
 270.0  906.7  20.5  19.5  93.8    7.7    0.9   7.8 263.2   3.1  -94.961   6.543 999.0 999.0   958.9 99.0 99.0 99.0 99.0 99.0 99.0
 272.0  906.1  20.5  19.4  93.7    7.7    0.8   7.8 264.0   3.1  -94.961   6.543 999.0 999.0   964.9 99.0 99.0 99.0 99.0 99.0 99.0
 274.0  905.5  20.5  19.4  93.6    7.8    0.7   7.8 264.9   3.2  -94.961   6.543 999.0 999.0   971.0 99.0 99.0 99.0 99.0 99.0 99.0
 276.0  904.8  20.4  19.4  93.5    7.8    0.5   7.8 266.0   3.2  -94.961   6.543 999.0 999.0   977.2 99.0 99.0 99.0 99.0 99.0 99.0
 278.0  904.2  20.4  19.3  93.4    7.8    0.4   7.8 267.3   3.3  -94.961   6.543 999.0 999.0   983.5 99.0 99.0 99.0 99.0 99.0 99.0
 280.0  903.5  20.4  19.3  93.3    7.8    0.2   7.8 268.7   3.3  -94.961   6.543 999.0 999.0   990.0 99.0 99.0 99.0 99.0 99.0 99.0
 282.0  902.8  20.4  19.3  93.3    7.9   -0.0   7.9 270.2   3.4  -94.961   6.543 999.0 999.0   996.7 99.0 99.0 99.0 99.0 99.0 99.0
 284.0  902.1  20.3  19.2  93.2    7.9   -0.3   7.9 271.9   3.5  -94.960   6.543 999.0 999.0  1003.6 99.0 99.0 99.0 99.0 99.0 99.0
 286.0  901.3  20.3  19.2  93.2    7.9   -0.5   7.9 273.6   3.6  -94.960   6.543 999.0 999.0  1010.6 99.0 99.0 99.0 99.0 99.0 99.0
 288.0  900.6  20.3  19.2  93.1    7.9   -0.7   7.9 275.4   3.7  -94.960   6.543 999.0 999.0  1017.9 99.0 99.0 99.0 99.0 99.0 99.0
 290.0  899.8  20.3  19.1  93.1    7.9   -1.0   7.9 277.3   3.7  -94.960   6.543 999.0 999.0  1025.4 99.0 99.0 99.0 99.0 99.0 99.0
 292.0  899.0  20.2  19.1  93.0    7.8   -1.3   7.9 279.1   3.8  -94.960   6.543 999.0 999.0  1033.1 99.0 99.0 99.0 99.0 99.0 99.0
 294.0  898.2  20.2  19.0  92.8    7.8   -1.5   7.9 280.9   3.9  -94.960   6.543 999.0 999.0  1040.9 99.0 99.0 99.0 99.0 99.0 99.0
 296.0  897.4  20.2  19.0  92.6    7.7   -1.7   7.9 282.7   3.9  -94.960   6.543 999.0 999.0  1049.0 99.0 99.0 99.0 99.0 99.0 99.0
 298.0  896.5  20.2  19.0  92.4    7.6   -2.0   7.8 284.4   4.0  -94.959   6.543 999.0 999.0  1057.1 99.0 99.0 99.0 99.0 99.0 99.0
 300.0  895.7  20.2  18.9  92.1    7.5   -2.2   7.8 286.1   4.0  -94.959   6.543 999.0 999.0  1065.4 99.0 99.0 99.0 99.0 99.0 99.0
 302.0  894.8  20.2  18.9  91.7    7.4   -2.4   7.8 287.6   4.0  -94.959   6.543 999.0 999.0  1073.6 99.0 99.0 99.0 99.0 99.0 99.0
 304.0  894.0  20.2  18.8  91.3    7.3   -2.5   7.7 289.1   4.0  -94.959   6.542 999.0 999.0  1081.9 99.0 99.0 99.0 99.0 99.0 99.0
 306.0  893.1  20.3  18.7  90.9    7.2   -2.7   7.6 290.4   4.0  -94.959   6.542 999.0 999.0  1090.1 99.0 99.0 99.0 99.0 99.0 99.0
 308.0  892.3  20.3  18.7  90.4    7.0   -2.8   7.6 291.7   4.0  -94.959   6.542 999.0 999.0  1098.2 99.0 99.0 99.0 99.0 99.0 99.0
 310.0  891.5  20.3  18.6  90.0    6.9   -2.9   7.5 292.9   4.0  -94.959   6.542 999.0 999.0  1106.3 99.0 99.0 99.0 99.0 99.0 99.0
 312.0  890.6  20.3  18.5  89.6    6.7   -3.0   7.4 294.0   4.0  -94.958   6.542 999.0 999.0  1114.3 99.0 99.0 99.0 99.0 99.0 99.0
 314.0  889.8  20.3  18.4  89.2    6.6   -3.1   7.2 295.0   4.0  -94.958   6.542 999.0 999.0  1122.2 99.0 99.0 99.0 99.0 99.0 99.0
 316.0  889.0  20.2  18.4  88.8    6.4   -3.1   7.1 296.1   4.0  -94.958   6.542 999.0 999.0  1130.1 99.0 99.0 99.0 99.0 99.0 99.0
 318.0  888.2  20.2  18.3  88.5    6.2   -3.2   7.0 297.2   3.9  -94.958   6.542 999.0 999.0  1137.9 99.0 99.0 99.0 99.0 99.0 99.0
 320.0  887.4  20.2  18.2  88.3    6.0   -3.2   6.8 298.3   3.9  -94.958   6.542 999.0 999.0  1145.6 99.0 99.0 99.0 99.0 99.0 99.0
 322.0  886.6  20.2  18.2  88.1    5.8   -3.3   6.6 299.4   3.9  -94.958   6.542 999.0 999.0  1153.3 99.0 99.0 99.0 99.0 99.0 99.0
 324.0  885.8  20.1  18.1  87.9    5.6   -3.3   6.5 300.6   3.9  -94.958   6.542 999.0 999.0  1161.0 99.0 99.0 99.0 99.0 99.0 99.0
 326.0  885.1  20.1  18.0  87.8    5.3   -3.3   6.3 301.9   3.9  -94.958   6.542 999.0 999.0  1168.6 99.0 99.0 99.0 99.0 99.0 99.0
 328.0  884.3  20.0  18.0  87.7    5.1   -3.3   6.1 303.2   3.8  -94.958   6.542 999.0 999.0  1176.2 99.0 99.0 99.0 99.0 99.0 99.0
 330.0  883.5  20.0  17.9  87.7    4.8   -3.4   5.9 304.7   3.8  -94.958   6.542 999.0 999.0  1183.8 99.0 99.0 99.0 99.0 99.0 99.0
 332.0  882.7  20.0  17.9  87.6    4.6   -3.4   5.7 306.2   3.8  -94.957   6.542 999.0 999.0  1191.3 99.0 99.0 99.0 99.0 99.0 99.0
 334.0  882.0  19.9  17.8  87.6    4.4   -3.4   5.5 307.8   3.8  -94.957   6.542 999.0 999.0  1198.9 99.0 99.0 99.0 99.0 99.0 99.0
 336.0  881.2  19.9  17.8  87.6    4.1   -3.4   5.3 309.4   3.8  -94.957   6.542 999.0 999.0  1206.5 99.0 99.0 99.0 99.0 99.0 99.0
 338.0  880.4  19.8  17.7  87.5    3.9   -3.4   5.2 311.0   3.8  -94.957   6.541 999.0 999.0  1214.1 99.0 99.0 99.0 99.0 99.0 99.0
 340.0  879.7  19.8  17.7  87.5    3.7   -3.4   5.0 312.7   3.8  -94.957   6.541 999.0 999.0  1221.7 99.0 99.0 99.0 99.0 99.0 99.0
 342.0  878.9  19.8  17.6  87.4    3.5   -3.4   4.9 314.3   3.8  -94.957   6.541 999.0 999.0  1229.3 99.0 99.0 99.0 99.0 99.0 99.0
 344.0  878.1  19.7  17.6  87.3    3.3   -3.4   4.7 316.0   3.8  -94.957   6.541 999.0 999.0  1237.0 99.0 99.0 99.0 99.0 99.0 99.0
 346.0  877.3  19.7  17.5  87.2    3.1   -3.4   4.6 317.6   3.8  -94.957   6.541 999.0 999.0  1244.6 99.0 99.0 99.0 99.0 99.0 99.0
 348.0  876.6  19.7  17.5  87.1    2.9   -3.4   4.5 319.3   3.8  -94.957   6.541 999.0 999.0  1252.3 99.0 99.0 99.0 99.0 99.0 99.0
 350.0  875.8  19.6  17.4  86.9    2.8   -3.4   4.4 321.0   3.8  -94.957   6.541 999.0 999.0  1259.9 99.0 99.0 99.0 99.0 99.0 99.0
 352.0  875.0  19.6  17.4  86.8    2.6   -3.4   4.3 322.7   3.8  -94.957   6.541 999.0 999.0  1267.6 99.0 99.0 99.0 99.0 99.0 99.0
 354.0  874.2  19.6  17.3  86.6    2.5   -3.5   4.2 324.6   3.8  -94.957   6.541 999.0 999.0  1275.3 99.0 99.0 99.0 99.0 99.0 99.0
 356.0  873.4  19.5  17.2  86.5    2.3   -3.5   4.2 326.6   3.8  -94.957   6.541 999.0 999.0  1283.0 99.0 99.0 99.0 99.0 99.0 99.0
 358.0  872.7  19.5  17.2  86.3    2.2   -3.6   4.2 328.7   3.8  -94.957   6.541 999.0 999.0  1290.7 99.0 99.0 99.0 99.0 99.0 99.0
 360.0  871.9  19.5  17.1  86.1    2.0   -3.6   4.2 331.0   3.8  -94.957   6.541 999.0 999.0  1298.4 99.0 99.0 99.0 99.0 99.0 99.0
 362.0  871.1  19.4  17.0  85.9    1.9   -3.7   4.2 333.5   3.8  -94.957   6.541 999.0 999.0  1306.1 99.0 99.0 99.0 99.0 99.0 99.0
 364.0  870.3  19.4  17.0  85.8    1.7   -3.8   4.2 336.0   3.8  -94.957   6.541 999.0 999.0  1313.9 99.0 99.0 99.0 99.0 99.0 99.0
 366.0  869.5  19.3  16.9  85.6    1.6   -4.0   4.3 338.6   3.8  -94.957   6.541 999.0 999.0  1321.6 99.0 99.0 99.0 99.0 99.0 99.0
 368.0  868.8  19.3  16.8  85.5    1.4   -4.1   4.3 341.1   3.8  -94.956   6.541 999.0 999.0  1329.3 99.0 99.0 99.0 99.0 99.0 99.0
 370.0  868.0  19.2  16.8  85.4    1.2   -4.2   4.4 343.6   3.8  -94.956   6.540 999.0 999.0  1337.0 99.0 99.0 99.0 99.0 99.0 99.0
 372.0  867.2  19.2  16.7  85.3    1.1   -4.4   4.5 345.8   3.8  -94.956   6.540 999.0 999.0  1344.7 99.0 99.0 99.0 99.0 99.0 99.0
 374.0  866.5  19.1  16.6  85.3    1.0   -4.5   4.6 347.8   3.8  -94.956   6.540 999.0 999.0  1352.3 99.0 99.0 99.0 99.0 99.0 99.0
 376.0  865.7  19.1  16.6  85.3    0.8   -4.6   4.7 349.6   3.8  -94.956   6.540 999.0 999.0  1359.9 99.0 99.0 99.0 99.0 99.0 99.0
 378.0  864.9  19.0  16.5  85.2    0.7   -4.7   4.8 351.1   3.7  -94.956   6.540 999.0 999.0  1367.4 99.0 99.0 99.0 99.0 99.0 99.0
 380.0  864.2  19.0  16.5  85.2    0.7   -4.9   4.9 352.2   3.7  -94.956   6.540 999.0 999.0  1374.8 99.0 99.0 99.0 99.0 99.0 99.0
 382.0  863.5  18.9  16.4  85.1    0.6   -5.0   5.0 353.1   3.7  -94.956   6.540 999.0 999.0  1382.2 99.0 99.0 99.0 99.0 99.0 99.0
 384.0  862.7  18.9  16.4  85.0    0.6   -5.1   5.1 353.8   3.7  -94.956   6.540 999.0 999.0  1389.6 99.0 99.0 99.0 99.0 99.0 99.0
 386.0  862.0  18.9  16.3  84.9    0.5   -5.2   5.2 354.2   3.7  -94.956   6.540 999.0 999.0  1396.9 99.0 99.0 99.0 99.0 99.0 99.0
 388.0  861.3  18.8  16.2  84.7    0.5   -5.3   5.3 354.4   3.7  -94.956   6.540 999.0 999.0  1404.2 99.0 99.0 99.0 99.0 99.0 99.0
 390.0  860.5  18.8  16.2  84.5    0.5   -5.3   5.4 354.6   3.7  -94.956   6.540 999.0 999.0  1411.5 99.0 99.0 99.0 99.0 99.0 99.0
 392.0  859.8  18.8  16.1  84.3    0.5   -5.4   5.4 354.6   3.7  -94.956   6.539 999.0 999.0  1418.8 99.0 99.0 99.0 99.0 99.0 99.0
 394.0  859.1  18.8  16.1  84.0    0.5   -5.5   5.5 354.7   3.7  -94.956   6.539 999.0 999.0  1426.1 99.0 99.0 99.0 99.0 99.0 99.0
 396.0  858.3  18.8  16.0  83.7    0.5   -5.6   5.6 354.7   3.7  -94.956   6.539 999.0 999.0  1433.5 99.0 99.0 99.0 99.0 99.0 99.0
 398.0  857.6  18.8  15.9  83.4    0.5   -5.6   5.7 354.7   3.7  -94.956   6.539 999.0 999.0  1440.8 99.0 99.0 99.0 99.0 99.0 99.0
 400.0  856.9  18.8  15.9  83.1    0.5   -5.7   5.7 354.9   3.7  -94.956   6.539 999.0 999.0  1448.1 99.0 99.0 99.0 99.0 99.0 99.0
 402.0  856.1  18.8  15.8  82.7    0.5   -5.8   5.8 355.0   3.7  -94.956   6.539 999.0 999.0  1455.5 99.0 99.0 99.0 99.0 99.0 99.0
 404.0  855.4  18.8  15.7  82.4    0.5   -5.8   5.9 355.3   3.7  -94.956   6.539 999.0 999.0  1462.9 99.0 99.0 99.0 99.0 99.0 99.0
 406.0  854.7  18.7  15.7  82.2    0.5   -5.9   5.9 355.6   3.8  -94.956   6.539 999.0 999.0  1470.4 99.0 99.0 99.0 99.0 99.0 99.0
 408.0  853.9  18.7  15.6  81.9    0.4   -5.9   6.0 356.0   3.8  -94.956   6.539 999.0 999.0  1477.9 99.0 99.0 99.0 99.0 99.0 99.0
 410.0  853.2  18.7  15.6  81.7    0.4   -6.0   6.0 356.5   3.8  -94.956   6.539 999.0 999.0  1485.4 99.0 99.0 99.0 99.0 99.0 99.0
 412.0  852.4  18.7  15.5  81.5    0.3   -6.0   6.0 357.1   3.9  -94.956   6.538 999.0 999.0  1493.1 99.0 99.0 99.0 99.0 99.0 99.0
 414.0  851.7  18.7  15.5  81.4    0.2   -6.1   6.1 357.8   3.9  -94.956   6.538 999.0 999.0  1500.8 99.0 99.0 99.0 99.0 99.0 99.0
 416.0  850.9  18.7  15.4  81.3    0.2   -6.1   6.1 358.5   3.9  -94.956   6.538 999.0 999.0  1508.6 99.0 99.0 99.0 99.0 99.0 99.0
 418.0  850.1  18.7  15.4  81.2    0.1   -6.1   6.1 359.3   4.0  -94.956   6.538 999.0 999.0  1516.5 99.0 99.0 99.0 99.0 99.0 99.0
 420.0  849.3  18.6  15.4  81.1   -0.0   -6.1   6.1   0.1   4.0  -94.956   6.538 999.0 999.0  1524.4 99.0 99.0 99.0 99.0 99.0 99.0
 422.0  848.5  18.6  15.3  81.1   -0.1   -6.2   6.2   1.0   4.0  -94.956   6.538 999.0 999.0  1532.5 99.0 99.0 99.0 99.0 99.0 99.0
 424.0  847.7  18.6  15.3  81.0   -0.2   -6.2   6.2   1.9   4.0  -94.956   6.538 999.0 999.0  1540.6 99.0 99.0 99.0 99.0 99.0 99.0
 426.0  846.9  18.6  15.3  81.0   -0.3   -6.3   6.3   2.8   4.1  -94.956   6.538 999.0 999.0  1548.8 99.0 99.0 99.0 99.0 99.0 99.0
 428.0  846.1  18.5  15.3  81.0   -0.4   -6.3   6.3   3.9   4.1  -94.956   6.538 999.0 999.0  1557.0 99.0 99.0 99.0 99.0 99.0 99.0
 430.0  845.3  18.5  15.2  81.0   -0.5   -6.4   6.4   4.9   4.1  -94.956   6.537 999.0 999.0  1565.2 99.0 99.0 99.0 99.0 99.0 99.0
 432.0  844.5  18.5  15.2  81.1   -0.7   -6.4   6.5   6.1   4.1  -94.956   6.537 999.0 999.0  1573.4 99.0 99.0 99.0 99.0 99.0 99.0
 434.0  843.7  18.4  15.2  81.1   -0.8   -6.5   6.5   7.3   4.1  -94.956   6.537 999.0 999.0  1581.6 99.0 99.0 99.0 99.0 99.0 99.0
 436.0  842.9  18.4  15.2  81.2   -1.0   -6.6   6.6   8.6   4.1  -94.956   6.537 999.0 999.0  1589.9 99.0 99.0 99.0 99.0 99.0 99.0
 438.0  842.1  18.4  15.2  81.3   -1.2   -6.6   6.7  10.0   4.1  -94.956   6.537 999.0 999.0  1598.1 99.0 99.0 99.0 99.0 99.0 99.0
 440.0  841.3  18.3  15.1  81.3   -1.4   -6.7   6.9  11.5   4.1  -94.956   6.537 999.0 999.0  1606.3 99.0 99.0 99.0 99.0 99.0 99.0
 442.0  840.5  18.3  15.1  81.4   -1.6   -6.8   7.0  13.1   4.1  -94.956   6.537 999.0 999.0  1614.6 99.0 99.0 99.0 99.0 99.0 99.0
 444.0  839.7  18.3  15.1  81.6   -1.8   -6.9   7.1  14.9   4.1  -94.956   6.537 999.0 999.0  1622.8 99.0 99.0 99.0 99.0 99.0 99.0
 446.0  838.9  18.2  15.1  81.7   -2.1   -6.9   7.2  16.6   4.1  -94.956   6.536 999.0 999.0  1631.0 99.0 99.0 99.0 99.0 99.0 99.0
 448.0  838.1  18.2  15.0  81.8   -2.3   -7.0   7.3  18.5   4.0  -94.956   6.536 999.0 999.0  1639.1 99.0 99.0 99.0 99.0 99.0 99.0
 450.0  837.3  18.1  15.0  81.9   -2.6   -7.0   7.5  20.4   4.0  -94.957   6.536 999.0 999.0  1647.2 99.0 99.0 99.0 99.0 99.0 99.0
 452.0  836.5  18.1  15.0  82.0   -2.9   -7.0   7.6  22.2   4.0  -94.957   6.536 999.0 999.0  1655.3 99.0 99.0 99.0 99.0 99.0 99.0
 454.0  835.7  18.0  15.0  82.2   -3.1   -7.0   7.7  24.0   3.9  -94.957   6.536 999.0 999.0  1663.3 99.0 99.0 99.0 99.0 99.0 99.0
 456.0  834.9  18.0  15.0  82.3   -3.4   -7.0   7.8  25.8   3.9  -94.957   6.536 999.0 999.0  1671.2 99.0 99.0 99.0 99.0 99.0 99.0
 458.0  834.2  17.9  14.9  82.4   -3.6   -7.0   7.9  27.4   3.8  -94.957   6.536 999.0 999.0  1679.1 99.0 99.0 99.0 99.0 99.0 99.0
 460.0  833.4  17.9  14.9  82.5   -3.8   -7.0   7.9  28.8   3.8  -94.957   6.536 999.0 999.0  1686.8 99.0 99.0 99.0 99.0 99.0 99.0
 462.0  832.7  17.8  14.9  82.7   -4.0   -6.9   8.0  30.0   3.8  -94.957   6.535 999.0 999.0  1694.3 99.0 99.0 99.0 99.0 99.0 99.0
 464.0  832.0  17.8  14.9  82.8   -4.1   -6.8   8.0  31.0   3.7  -94.957   6.535 999.0 999.0  1701.8 99.0 99.0 99.0 99.0 99.0 99.0
 466.0  831.3  17.7  14.8  82.8   -4.2   -6.8   8.0  31.8   3.7  -94.957   6.535 999.0 999.0  1709.1 99.0 99.0 99.0 99.0 99.0 99.0
 468.0  830.6  17.7  14.8  82.9   -4.2   -6.7   7.9  32.2   3.6  -94.957   6.535 999.0 999.0  1716.3 99.0 99.0 99.0 99.0 99.0 99.0
 470.0  829.9  17.7  14.8  83.0   -4.2   -6.6   7.9  32.4   3.6  -94.957   6.535 999.0 999.0  1723.4 99.0 99.0 99.0 99.0 99.0 99.0
 472.0  829.2  17.6  14.8  83.0   -4.1   -6.6   7.8  32.2   3.5  -94.957   6.535 999.0 999.0  1730.5 99.0 99.0 99.0 99.0 99.0 99.0
 474.0  828.5  17.6  14.7  83.0   -4.0   -6.5   7.7  31.7   3.5  -94.957   6.535 999.0 999.0  1737.4 99.0 99.0 99.0 99.0 99.0 99.0
 476.0  827.9  17.6  14.7  83.0   -3.9   -6.5   7.6  30.8   3.5  -94.957   6.535 999.0 999.0  1744.3 99.0 99.0 99.0 99.0 99.0 99.0
 478.0  827.2  17.5  14.7  83.0   -3.7   -6.5   7.5  29.6   3.5  -94.957   6.534 999.0 999.0  1751.2 99.0 99.0 99.0 99.0 99.0 99.0
 480.0  826.5  17.5  14.6  83.0   -3.5   -6.5   7.4  28.2   3.4  -94.958   6.534 999.0 999.0  1758.1 99.0 99.0 99.0 99.0 99.0 99.0
 482.0  825.9  17.5  14.6  83.0   -3.3   -6.5   7.3  26.5   3.4  -94.958   6.534 999.0 999.0  1764.9 99.0 99.0 99.0 99.0 99.0 99.0
 484.0  825.2  17.5  14.6  82.9   -3.0   -6.6   7.3  24.6   3.4  -94.958   6.534 999.0 999.0  1771.7 99.0 99.0 99.0 99.0 99.0 99.0
 486.0  824.6  17.4  14.5  82.9   -2.8   -6.7   7.3  22.7   3.4  -94.958   6.534 999.0 999.0  1778.5 99.0 99.0 99.0 99.0 99.0 99.0
 488.0  823.9  17.4  14.5  82.8   -2.6   -6.8   7.3  20.8   3.4  -94.958   6.534 999.0 999.0  1785.2 99.0 99.0 99.0 99.0 99.0 99.0
 490.0  823.3  17.4  14.4  82.7   -2.4   -6.9   7.4  19.1   3.4  -94.958   6.534 999.0 999.0  1792.0 99.0 99.0 99.0 99.0 99.0 99.0
 492.0  822.6  17.3  14.4  82.7   -2.2   -7.1   7.4  17.5   3.5  -94.958   6.534 999.0 999.0  1798.8 99.0 99.0 99.0 99.0 99.0 99.0
 494.0  822.0  17.3  14.3  82.6   -2.1   -7.3   7.6  16.3   3.5  -94.958   6.534 999.0 999.0  1805.7 99.0 99.0 99.0 99.0 99.0 99.0
 496.0  821.3  17.3  14.3  82.5   -2.0   -7.4   7.7  15.3   3.5  -94.958   6.533 999.0 999.0  1812.6 99.0 99.0 99.0 99.0 99.0 99.0
 498.0  820.6  17.2  14.2  82.4   -2.0   -7.6   7.8  14.6   3.6  -94.958   6.533 999.0 999.0  1819.6 99.0 99.0 99.0 99.0 99.0 99.0
 500.0  820.0  17.2  14.2  82.3   -2.0   -7.7   8.0  14.1   3.6  -94.958   6.533 999.0 999.0  1826.6 99.0 99.0 99.0 99.0 99.0 99.0
 502.0  819.3  17.1  14.1  82.2   -2.0   -7.9   8.1  14.0   3.6  -94.958   6.533 999.0 999.0  1833.8 99.0 99.0 99.0 99.0 99.0 99.0
 504.0  818.6  17.1  14.1  82.1   -2.0   -8.0   8.2  14.0   3.7  -94.958   6.533 999.0 999.0  1841.2 99.0 99.0 99.0 99.0 99.0 99.0
 506.0  817.9  17.1  14.0  82.0   -2.0   -8.1   8.3  14.1   3.7  -94.958   6.533 999.0 999.0  1848.6 99.0 99.0 99.0 99.0 99.0 99.0
 508.0  817.1  17.0  14.0  81.9   -2.1   -8.1   8.4  14.4   3.7  -94.958   6.533 999.0 999.0  1856.2 99.0 99.0 99.0 99.0 99.0 99.0
 510.0  816.4  17.0  13.9  81.8   -2.1   -8.1   8.4  14.7   3.7  -94.958   6.532 999.0 999.0  1863.8 99.0 99.0 99.0 99.0 99.0 99.0
 512.0  815.7  16.9  13.8  81.7   -2.2   -8.1   8.4  15.0   3.7  -94.958   6.532 999.0 999.0  1871.5 99.0 99.0 99.0 99.0 99.0 99.0
 514.0  814.9  16.9  13.8  81.7   -2.2   -8.1   8.4  15.3   3.8  -94.958   6.532 999.0 999.0  1879.2 99.0 99.0 99.0 99.0 99.0 99.0
 516.0  814.2  16.9  13.7  81.6   -2.2   -8.0   8.3  15.5   3.8  -94.958   6.532 999.0 999.0  1886.9 99.0 99.0 99.0 99.0 99.0 99.0
 518.0  813.5  16.8  13.7  81.6   -2.2   -7.9   8.2  15.7   3.8  -94.958   6.532 999.0 999.0  1894.5 99.0 99.0 99.0 99.0 99.0 99.0
 520.0  812.8  16.8  13.7  81.6   -2.2   -7.7   8.0  15.7   3.8  -94.958   6.532 999.0 999.0  1902.1 99.0 99.0 99.0 99.0 99.0 99.0
 522.0  812.0  16.7  13.6  81.6   -2.1   -7.6   7.9  15.6   3.7  -94.958   6.532 999.0 999.0  1909.6 99.0 99.0 99.0 99.0 99.0 99.0
 524.0  811.3  16.7  13.6  81.6   -2.0   -7.4   7.7  15.4   3.7  -94.958   6.531 999.0 999.0  1917.1 99.0 99.0 99.0 99.0 99.0 99.0
 526.0  810.6  16.6  13.5  81.7   -1.9   -7.2   7.5  15.0   3.7  -94.958   6.531 999.0 999.0  1924.5 99.0 99.0 99.0 99.0 99.0 99.0
 528.0  809.9  16.6  13.5  81.8   -1.8   -7.0   7.2  14.5   3.7  -94.959   6.531 999.0 999.0  1931.9 99.0 99.0 99.0 99.0 99.0 99.0
 530.0  809.2  16.5  13.5  81.9   -1.7   -6.8   7.0  13.9   3.7  -94.959   6.531 999.0 999.0  1939.2 99.0 99.0 99.0 99.0 99.0 99.0
 532.0  808.5  16.5  13.4  82.0   -1.5   -6.6   6.8  13.2   3.7  -94.959   6.531 999.0 999.0  1946.5 99.0 99.0 99.0 99.0 99.0 99.0
 534.0  807.9  16.4  13.4  82.1   -1.4   -6.4   6.6  12.4   3.7  -94.959   6.531 999.0 999.0  1953.8 99.0 99.0 99.0 99.0 99.0 99.0
 536.0  807.2  16.4  13.4  82.2   -1.3   -6.2   6.3  11.5   3.6  -94.959   6.531 999.0 999.0  1961.0 99.0 99.0 99.0 99.0 99.0 99.0
 538.0  806.5  16.3  13.3  82.3   -1.1   -6.0   6.1  10.5   3.6  -94.959   6.531 999.0 999.0  1968.2 99.0 99.0 99.0 99.0 99.0 99.0
 540.0  805.8  16.3  13.3  82.4   -1.0   -5.8   5.9   9.4   3.6  -94.959   6.530 999.0 999.0  1975.3 99.0 99.0 99.0 99.0 99.0 99.0
 542.0  805.1  16.2  13.3  82.5   -0.8   -5.6   5.7   8.3   3.6  -94.959   6.530 999.0 999.0  1982.5 99.0 99.0 99.0 99.0 99.0 99.0
 544.0  804.5  16.2  13.2  82.6   -0.7   -5.4   5.5   7.0   3.6  -94.959   6.530 999.0 999.0  1989.7 99.0 99.0 99.0 99.0 99.0 99.0
 546.0  803.8  16.1  13.2  82.8   -0.5   -5.2   5.3   5.6   3.6  -94.959   6.530 999.0 999.0  1996.8 99.0 99.0 99.0 99.0 99.0 99.0
 548.0  803.1  16.0  13.2  82.9   -0.4   -5.1   5.1   4.2   3.6  -94.959   6.530 999.0 999.0  2004.0 99.0 99.0 99.0 99.0 99.0 99.0
 550.0  802.4  16.0  13.1  83.0   -0.2   -4.9   4.9   2.6   3.6  -94.959   6.530 999.0 999.0  2011.2 99.0 99.0 99.0 99.0 99.0 99.0
