Hour (UTC)

Height (km)

STRATUS 2004 day 341 Wind profiler rcSNR

0 4 8 12 16 20 24 0

0.5

1

1.5

2

2.5 rcSNR

-35 -30 -25 -20 -15 -10 -5 0 5